Species Tag: 47008 Name: cis-DCOOH Version: 1 Formic acid, Date: March 2008 deuterium isotope Contributor: B. J. Drouin on C atom

Lines Listed: 22490 Q(300.0)= 10344.3383 Freq. (GHz) < 1900 Q(225.0)= 6716.8758 Max. J: 90 Q(150.0)= 3655.7721 LOGSTR0= -11.0 Q(75.00)= 1293.2635 LOGSTR1= -11.0 Q(37.50)= 458.0933 Isotope Corr.: -3.824 Q(18.75)= 162.6259 Egy. (cm^{−1}) > 0.0 Q(9.375)= 57.9828 μ_a = 2.65 A= 62653.45 μ_b = 2.71 B= 11690.168 μ_c = C= 9837.916

The measurements were taken from J. Bellet, A. Deldalle, C. Samson, G. Steenbeckeliers, and R. Wertheimer, 1971, J. Mol. Struc. 9, 65, and R. G. Lerner, B. P. Dailey, and J. P. Friend, 1957, J. Chem. Phys. 26, 680. Submillimeter measurements are from Lattanzi et al. Ap. J. Supp. in press 2008. The dipole moment was assumed to be the same as for the parent species.